\begin{thebibliography}{}

\bibitem[Beranek and Mellow, 2012]{BeranekMellow12}
Beranek, L.~L. and Mellow, T.~J. (2012).
\newblock {\em Acoustics: Sound Fields and Transducers}.
\newblock Academic Press - Elsevier Inc., Waltham, MA.

\bibitem[Kim and Allen, 2013]{KimAllen13}
Kim, N. and Allen, J.~B. (2013).
\newblock Two-port network analysis and modeling of a balanced armature
  receiver.
\newblock {\em Hearing Research}, 301:156--167.

\bibitem[Kim et~al., 2016]{KimYoonAllen16}
Kim, N., Yoon, Y.-J., and Allen, J.~B. (2016).
\newblock Generalized metamaterials: Definitions and taxonomy.
\newblock {\em J. Acoust. Soc. Am.}, 139:3412--3418.

\bibitem[Rayleigh, 1896]{Rayleigh1896}
Rayleigh, J.~W. (1896).
\newblock {\em Theory of Sound, Vol.~I 480 pages, Vol.~II 504 pages}.
\newblock Dover, New York.

\bibitem[Van~Valkenburg, 1964]{VanValkenburg-A64}
Van~Valkenburg, M. (1964).
\newblock {\em Network Analysis second edition}.
\newblock Prentice-Hall, Englewood Cliffs, N.J.

\end{thebibliography}
